PART 4

Airworthiness of Aircraft
CHAPTER 3

Continuing airworthiness for Non-Part-21 aircraft

Subsequent issue of national airworthiness review certificate
53
1
This article applies to an aircraft with a national certificate of airworthiness which has previously had a national airworthiness review certificate.
2
A national airworthiness review certificate may be issued for an aircraft to which this article applies in accordance with paragraph (3) or (4).
3
A national airworthiness review certificate may be issued by the CAA—
a
following the completion of an airworthiness review by the CAA; or
b
in the case of an aircraft which has a maximum total weight authorised of 2,730kg or less and is not a commercial air transport aircraft, public transport aircraft or non-military State aircraft, on receipt of a recommendation for its issue from an aeroplane and rotorcraft maintenance organisation approved in accordance with article 62.
4
A national airworthiness review certificate may be issued by a continuing airworthiness management organisation approved under article 61.
5
A national airworthiness review certificate may be issued under paragraph (3)(a) or paragraph (4) only when the CAA or the issuing organisation is satisfied that it may properly do so after carrying out an airworthiness review.
6
A recommendation to issue a national airworthiness review certificate under paragraph (3)(b) may be made only when the organisation making the recommendation is satisfied that it may properly do so after carrying out an airworthiness review.
Word in Pt. 4 Ch. 3 heading substituted (31.12.2020) by The Aviation Safety (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/645), reg. 1, Sch. 1 para. 17 (with Sch. 3) (as amended by S.I. 2019/1098, regs. 1(3), 12); 2020 c. 1, Sch. 5 para. 1(1)