PART 7

Air traffic services
CHAPTER 5

Air traffic service equipment

Air traffic service equipment
205
1
A person must not cause or permit any air traffic service equipment to be established or used in the United Kingdom otherwise than under and in accordance with an approval granted by the CAA to the person in charge of the equipment.
2
An approval must be granted under paragraph (1) if the CAA is satisfied—
a
as to the intended purpose of the equipment;
b
that the equipment is fit for its intended purpose; and
c
that the person is competent to operate the equipment.
3
The person in charge of an aeronautical radio station at an aerodrome for which a public use licence has been granted or at a certified aerodrome must cause to be notified in relation to that aeronautical radio station the type and availability of operation of any service which is available for use by any aircraft.
4
An approval granted under paragraph (1) may include a condition requiring a person in charge of an aeronautical radio station at any other aerodrome or place to cause the information specified in paragraph (3) to be notified.
5
An approval granted under paragraph (1) may include such other conditions as the CAA thinks fit including—
a
a condition requiring the person in charge of the equipment to use a person approved by the CAA under paragraph (6) for the provision of particular services in connection with the equipment; and
b
a condition requiring that the equipment be flight checked by such an approved person.
6
The CAA may approve a person to provide particular services in connection with approved equipment.
7
For the purpose of paragraphs (1) and (6) an approval may be granted for one or more persons or generally.
8
This article does not apply to any air traffic service equipment of which the person solely in charge is the Secretary of State.
Word in art. 205(3) substituted (31.12.2020) by The Aviation Safety (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/645), reg. 1, Sch. 1 para. 52 (with Sch. 3) (as amended by S.I. 2019/1098, regs. 1(3), 12); 2020 c. 1, Sch. 5 para. 1(1)