SCHEDULE 1 Amendments to the Electricity Capacity Regulations 2014

PART 6 Miscellaneous and minor amendments

43 Regulation 7 (annual electricity capacity report)
In regulation 7—
(a) omit paragraph (4)(c)(i) and (ii); and
(b) after paragraph (4) insert—

“5 An electricity capacity report must include the de-rating factors that the Delivery Body estimates will apply to—
(a) generating CMUs in each generating technology class; and
(b) demand side response CMUs;
for the purposes of capacity auctions held in the following auction window.”

.