5 Amendment of regulation 7 (interpretation: operate a regulated facility and operator)
In regulation 7, in paragraph (b) of the definition of “operate a regulated facility”, for “or solvent emission activity” substitute “, solvent emission activity or flood risk activity”.
Paragraph (b) of this definition was amended by S.I. 2013/390.