PART 3 Amendment of the PDS Regulations

17 Amendment of regulation 14B of the PDS Regulations
In regulation 14B of the PDS Regulations (capitated patient figures for contractors who elect to enter into a prototype agreement), after “has elected to enter into a prototype agreement”, insert “except where the contractor is a CDS prototype contractor,”.
Regulation 14B was inserted by S.I. 2015/1728.