Statutory Instruments
2016 No. 21
Electricity
The Onshore Wind Generating Stations (Exemption) (England and Wales) Order 2016 (revoked)
Order revoked (12.7.2016) by The Onshore Wind Generating Stations (Exemption) (England and Wales) (Revocation) Order 2016 (S.I. 2016/605), arts. 1(1), 2
Made 12th January 2016
Laid before Parliament 14th January 2016
Coming into force 1st March 2016

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Citation, commencement and extent
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Interpretation
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Exemption for onshore wind generating stations
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .