2015 No. 988
National Health Service, England
Public Health, England
The False or Misleading Information (Specified Care Providers and Specified Information) Regulations 2015
Made 26th March 2015
Coming into force in accordance with regulation 1(1)

The Secretary of State makes the following Regulations in exercise of the powers conferred by section 92(1) of the Care Act 2014.
2014 c. 23. Section 92(6) of the Care Act 2014 provides that “specified” means specified in Regulations. Section 125(1) of that Act provides that the power to make regulations is exercisable by the Secretary of State.
A draft of these Regulations was laid before Parliament in accordance with section 125(4)(m) of the Care Act 2014, and was approved by a resolution of each House of Parliament.