SCHEDULE 2

Permitted development rights
PART 7

Non-domestic extensions, alterations etc

Class C – click and collect facilities

Development not permitted
C
Development is not permitted by Class C if—
a
the development would result in more than 1 collection facility within the curtilage of a shop;
b
the gross floor space of the building or structure would exceed 20 square metres;
c
the height of the building or structure would exceed 4 metres;
d
any part of the development would be within 2 metres of any boundary of the curtilage;
e
any part of the development would be between a shop front and a highway where the distance between the shop front and the boundary of the curtilage of the premises is less than 5 metres; or
f
any part of the development would be—
i
on article 2(3) land;
ii
in a site of special scientific interest; or
iii
within the curtilage of a listed building or a scheduled monument.