PART 3 USE OF ULTRA-WIDEBAND EQUIPMENT IN LOCATION TRACKING SYSTEMS

8 Exemption
The establishment, installation or use of ultra-wideband equipment complying with the terms, provisions and limitations in regulation 9 is hereby exempt from the provisions of section 8(1) of the Act.
Reg. 8 in force at 25.3.2015, see reg. 1