SCHEDULE 3

Commission Regulation provisions
Regulation 25(1)(a)(ii)
Table 1

Certification for stationary refrigeration, air conditioning and heat pump equipment
Provision of Commission Regulation 303/2008 | Summary of subject matter
Article 4(1) (read in association with Articles 2 and 4(3)) | Requirement on personnel carrying out activities referred to in Article 2(1) (scope) to hold a certificate as referred to in Article 5 (personnel certificates) for the corresponding category set out in Article 4(2) (certification of personnel).
Article 7(1) | Requirement on companies carrying out activities referred to in Article 2(2) to hold a certificate as referred to in Article 8 (company certificates).
Table 2

Certification for stationary fire protection systems and fire extinguishers
Provision of Commission Regulation 304/2008 | Summary of subject matter
Article 4(1) (read in association with Articles 2 and 4(2)) | Requirement on personnel carrying out activities referred to in Article 2(1) (scope) to hold a certificate as referred to in Article 5 (personnel certificates).
Article 7(1) | Requirement on companies carrying out activities referred to in Article 2(2) to hold a certificate as referred to in Article 8 (company certificates).
Table 3

Certification for recovery of fluorinated greenhouse gases from high voltage switchgear
Provision of Commission Regulation 305/2008 | Summary of subject matter
Article 3(1) (read in association with Article 3(2)) | Requirement on personnel carrying out the activity referred to in Article 1 (subject matter and scope) to hold a certificate as referred to in Article 4 (issuance of certificates to personnel).
Table 4

Certification for recovery of fluorinated greenhouse gas-based solvents from equipment
Provision of Commission Regulation 306/2008 | Summary of subject matter
Article 2(1) (read in association with Article 2(2)) | Requirement on personnel carrying out the activity referred to in Article 1 (subject matter and scope) to hold a certificate as referred to in Article 3 (issuance of certificates to personnel).
Table 5

Attestation for air conditioning systems in motor vehicles
Provision of Commission Regulation 307/2008 | Summary of subject matter
Article 2(1) (read in association with Article 2(2)) | Requirement on personnel carrying out the activity referred to in Article 1 (subject matter) hold a training attestation as referred to in Article 3 (issuance of training attestations to personnel).