SCHEDULE 3

Commission Regulation provisions
Regulation 25(1)(a)(ii)
Table 1

Certification for stationary refrigeration, air conditioning and heat pump equipment
Provision of Commission Regulation 2015/2067 | Summary of subject matter
Article 3(1) (read in association with Articles 2 and 3(3) and (4)) | Requirement on natural persons carrying out activities referred to in Article 2(1) (scope) to hold a certificate as referred to in Article 4 (certificates for natural persons) for the corresponding category as set out in Article 3(2) (certification of natural persons).
Article 5 | Requirement on companies referred to in Article 2(2) to hold a certificate as referred to in Article 6 (company certificates).
Table 2

Certification for stationary fire protection systems and fire extinguishers
Provision of Commission Regulation 304/2008 | Summary of subject matter
Article 4(1) (read in association with Articles 2 and 4(2)) | Requirement on personnel carrying out activities referred to in Article 2(1) (scope) to hold a certificate as referred to in Article 5 (personnel certificates).
Article 7(1) | Requirement on companies carrying out activities referred to in Article 2(2) to hold a certificate as referred to in Article 8 (company certificates).
Table 3

Certification for electrical switchgear
Provision of Commission Regulation 2015/2066 | Summary of subject matter
Article 2(1) (read in association with Articles 2(2) and (3) and 9) | Requirement on natural persons carrying out the activities referred to in Article 1 (subject matter and scope) to hold a certificate as referred to in Article 3 (issuance of certificates to natural persons).
Table 4

Certification for recovery of fluorinated greenhouse gas-based solvents from equipment
Provision of Commission Regulation 306/2008 | Summary of subject matter
Article 2(1) (read in association with Article 2(2)) | Requirement on personnel carrying out the activity referred to in Article 1 (subject matter and scope) to hold a certificate as referred to in Article 3 (issuance of certificates to personnel).
Table 5

Attestation for air conditioning systems in motor vehicles
Provision of Commission Regulation 307/2008 | Summary of subject matter
Article 2(1) (read in association with Article 2(2)) | Requirement on personnel carrying out the activity referred to in Article 1 (subject matter) hold a training attestation as referred to in Article 3 (issuance of training attestations to personnel).
Table 6

Declaration of conformity and verification document for equipment charged with hydrofluorocarbons
Provision of Commission Regulation 2016/879 | Summary of subject matter
Article 1(2) | Requirement for importers of equipment charged with hydrofluorocarbons to ensure that a copy of the declaration of conformity is available to the customs authorities when the customs declaration is submitted.
Article 4 | Requirement for importers of equipment to submit the verification document using the reporting tool made available by the Commission appropriate regulator under Article 1 of Commission Regulation 1191/2014 by 31st March every year for the preceding calendar year.
Sch. 3 Table 1 substituted (22.2.2018) by The Fluorinated Greenhouse Gases (Amendment) Regulations 2018 (S.I. 2018/98), regs. 1(2), 30(2)
Sch. 3 Table 3 substituted (22.2.2018) by The Fluorinated Greenhouse Gases (Amendment) Regulations 2018 (S.I. 2018/98), regs. 1(2), 30(3)
Sch. 3 Table 6 inserted (22.2.2018) by The Fluorinated Greenhouse Gases (Amendment) Regulations 2018 (S.I. 2018/98), regs. 1(2), 30(4)
Words in Sch. 3 Table 6 substituted (E.W.S) (31.12.2020) by The Ozone-Depleting Substances and Fluorinated Greenhouse Gases (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/583), regs. 1(1), 35(1)(7) (as amended by S.I. 2020/1616, regs. 1(2), 2(2)(18)(a)); 2020 c. 1, Sch. 5 para. 1(1)