PART 3

Certification, evaluation and attestation

Certificates relating to stationary refrigeration, air conditioning and heat pump equipment issued in EEA States and Northern Ireland
9
1
A person who holds a valid certificate issued under Article 4 or 6 of Commission Regulation 2015/2067 by a certification body in an EEA State other than the United Kingdom in respect of an activity mentioned in Article 2 of that Regulation may not carry out that activity unless—
a
the certificate is written in English; or
b
the person holds a translation of the certificate in English.
2
A person who holds a valid certificate issued under Article 4 or 6 of Commission Regulation 2015/2067 by a certification body appointed in Northern Ireland in respect of an activity mentioned in Article 2 of that Regulation may carry out that activity.
Words in reg. 9(1) substituted (22.2.2018) by The Fluorinated Greenhouse Gases (Amendment) Regulations 2018 (S.I. 2018/98), regs. 1(2), 10
Words in reg. 9(2) substituted (22.2.2018) by The Fluorinated Greenhouse Gases (Amendment) Regulations 2018 (S.I. 2018/98), regs. 1(2), 10
Words in reg. 9(1) omitted (E.W.S.) (31.12.2020) by virtue of The Ozone-Depleting Substances and Fluorinated Greenhouse Gases (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/583), regs. 1(1), 35(1)(4) (as amended by S.I. 2020/1616, regs. 1(2), 2(2)(18)(a)); 2020 c. 1, Sch. 5 para. 1(1)