PART 3

Certification, evaluation and attestation

Certificates relating to electrical switchgear issued in EEA States and Northern Ireland
13
1
An individual who holds a valid certificate issued under Article 3 of Commission Regulation 2015/2066 by a certification body in an EEA State other than the United Kingdom may not carry out the activity mentioned in Article 1 of that Regulation unless—
a
the certificate is written in English; or
b
the individual holds a translation of the certificate in English.
2
An individual who holds a valid certificate issued under Article 3 of Commission Regulation 2015/2066 by a certification body appointed in Northern Ireland in respect of the activity mentioned in Article 1 of that Regulation may carry out that activity.
Word in reg. 13 heading substituted (22.2.2018) by The Fluorinated Greenhouse Gases (Amendment) Regulations 2018 (S.I. 2018/98), regs. 1(2), 12(2)
Words in reg. 13(1) substituted (22.2.2018) by The Fluorinated Greenhouse Gases (Amendment) Regulations 2018 (S.I. 2018/98), regs. 1(2), 12(3)
Words in reg. 13(2) substituted (22.2.2018) by The Fluorinated Greenhouse Gases (Amendment) Regulations 2018 (S.I. 2018/98), regs. 1(2), 12(3)
Words in reg. 13(1) omitted (E.W.S.) (31.12.2020) by virtue of The Ozone-Depleting Substances and Fluorinated Greenhouse Gases (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/583), regs. 1(1), 35(1)(4) (as amended by S.I. 2020/1616, regs. 1(2), 2(2)(18)(a)); 2020 c. 1, Sch. 5 para. 1(1)