Article 2 (interpretation)
3
In article 2 (interpretation)—
a
in paragraph (1)—
i
for the definition of “MCS”, substitute—
- “MCS”, except in Schedule A1, means the Microgeneration Certification Scheme or equivalent schemes accredited in accordance with EN 45011(2) or EN ISO/IEC 17065:2012(3) which certify microgeneration products and installers in accordance with consistent standards;
; and
ii
in the appropriate places insert the following definitions—
- “commissioning date”, in relation to an installation, means the date on which the installation is commissioned;
;
- “MCS-certified installation” has the meaning set out in Schedule A1 to this Order;
;
- “pause period” has the meaning given in article 8A;
;
- “tariff period” means one of the following periods—
  1. the period beginning on 8th February 2016 and ending on 31st March 2016;
  2. the period of 3 months beginning on 1st April 2016; or
  3. any subsequent period of 3 months beginning on 1st July, 1st October, 1st January or 1st April;
;
b
in paragraph (2), omit “MCS-certified installation”; and
c
after paragraph (3), insert—
4
In this Order, a reference to a particular description of eligible installations is a reference to eligible installations of one of the descriptions in the first column of the table in Schedule 1A.
.
European standards are published by the European Committee on Standardization (CEN): www.cen.eu.
ISO standards can be obtained from the International Organization for Standardization: www.iso.org.
Art. 3 in force at 15.1.2016, see art. 1