SCHEDULE Consequential amendments to regulations made under section 15 of the Health and Safety at Work etc. Act 1974

1 Health and Safety (First-Aid) Regulations 1981
For regulation 5 of the Health and Safety (First-Aid) Regulations 1981 (duty of self-employed person to provide first-aid equipment) substitute—

“5 Duty of relevant self-employed person to provide first-aid equipment
1 A relevant self-employed person must provide, or ensure that there is provided, such equipment, if any, as is adequate and appropriate in the circumstances to enable that person to render first-aid to himself or herself while at work.
2 For the purpose of this regulation “relevant self-employed person” means a self-employed person who conducts an undertaking of a prescribed description for the purposes of section 3(2) of the Health and Safety at Work etc. Act 1974.
Section 3(2) of the Health and Safety at Work etc. Act 1974 (c.37) was amended by section 1 of the Deregulation Act 2015. The Health and Safety at Work etc. Act 1974 (General Duties of Self-Employed Persons) (Prescribed Undertakings) Regulations 2015 (S.I. 2015/1583) prescribe descriptions of undertakings for the purposes of section 3(2) of the Health and Safety at Work etc. Act 1974 (as amended).”

.
S.I. 1981/917; to which there are amendments not relevant to this Order.