EXPLANATORY NOTE
(This note is not part of the Order)
The Coroners and Justice Act 2009 (Coroner Areas and Assistant Coroners) Transitional Order 2013, which came into force on 25th July 2013, constituted the former coroners’ districts under the Coroners Act 1988 as corresponding coroner areas under the Coroners and Justice Act 2009.
This Order combines the coroner area of South and West Cambridgeshire, the coroner area of North and East Cambridgeshire and the coroner area of Peterborough into a single, new coroner area called Cambridgeshire and Peterborough.
A full impact assessment has not been produced for this instrument as no impact on the private, voluntary or public sectors is foreseen.