SCHEDULE 2 REQUIREMENTS

23 Quantities and types of waste
The maximum quantity of waste that is to be imported to the interceptor treatment facility per annum will be 20,000 tonnes and the maximum quantity of waste that is to be imported to the landfill per annum will be 150,000 tonnes. No waste materials may be accepted on the application land other than hazardous wastes or suitable waste materials for engineering and restoration purposes.