PART 2 Eligibility criteria

6 Requirements for solar thermal plants
Where the plant is a solar thermal plant, the applicable requirements referred to in regulation 3(a) are that it—
(a) is designed and installed to provide heating solely to a single eligible property and solely for an eligible purpose using liquid as a medium for delivering that heat;
(b) meets the requirements set out in whichever of the standards for solar thermal plants specified in paragraph 1(5)(a) and (b) of Schedule 1 are relevant to the plant and are applicable on the plant’s first commissioning date;
(c) cannot also be used to generate electricity.