PART 2 Arrestment plant - exemptions

Arrestment plant exemptions
3. A class of furnace listed in column 1 of Schedule 2 to these Regulations, while used for a purpose set out in column 2 in relation to that class, is exempted from the provisions of section 6(1) (which requires the fitting of arrestment plant to new non-domestic furnaces).