SCHEDULE 2 Minimum requirements for billing and billing information
1 At least once a year a bill must be issued to the final customer on the basis of actual rather than estimated consumption provided that—
(a) the final customer has provided a meter reading, or
(b) the heat supplier has taken a meter reading.