PART 2

Risk Assessment and Notification of Contained Use

Single notifications to the joint competent authority and for connected programmes of work
13
1
Where a notification is required under regulation 10(2), 11(2) or 12(2) in respect of a contained use which is to take place in premises that fall within regulation 9(5) the notifier must submit the notification for that contained use to the joint competent authority.
2
A competent authority, or where paragraph (1) applies the joint competent authority, may accept a single notification submitted under regulation 10(2), 11(2) or 12(2) in respect of a connected programme of work undertaken at—
a
one premises; or
b
more than one premises.
3
A competent authority, or where paragraph (1) applies the joint competent authority, may accept a single notification submitted under regulation 10(2), 11(2) or 12(2) in respect of a single contained use undertaken at more than one premises.
4
In this regulation—
“connected programme of work” means a series of activities involving contained use which form a coherent and integrated programme.