2014 No. 1459
Human Tissue
The Quality and Safety of Organs Intended for Transplantation (Amendment) Regulations 2014
Made 4th June 2014
Laid before Parliament 12th June 2014
Coming into force 14th July 2014

The Secretary of State is a Minister designated for the purposes of section 2(2) of the European Communities Act 1972 in relation to health protection measures regulating the use of material of human origin.
S.I. 2004/3037.
1972 c.68. Amended by section 27(1)(a) of the Legislative and Regulatory Reform Act 2006 and section 3(3) of, and Part 1 of the Schedule to, the European Union (Amendment) Act 2008.
The Secretary of State makes these Regulations in exercise of the powers conferred by section 2(2) of the European Communities Act 1972.