EXPLANATORY NOTE
(This note is not part of the Regulations)
1
These Regulations impose duties on employers in the healthcare sector to protect employees from injuries caused by medical sharps, implementing Council Directive 2010/32/EU (OJ No. L 134, 1.6.2010) p.66 of 10 May 2010 implementing the Framework Agreement on prevention from sharp injuries in the hospital and healthcare sector concluded by HOSPEEM and EPSU. Other requirements of that Directive are implemented by existing statutory provision.
2
Regulation 2 defines key concepts in the Regulations. “Healthcare contractors” are distinguished from “healthcare employers” to ensure that employers to whom the Regulations apply are only caught by one or other of the definitions.
3
Regulation 3 establishes which employers the Regulations apply to. It provides that the Regulations apply to both a healthcare employer and a healthcare contractor (i.e. a subcontractor of a healthcare employer).
4
Regulation 4(1) confines the application of requirements imposed by the Regulations on healthcare contractors to particular circumstances – i.e. work on the premises, or under the authority, of a healthcare employer. Regulation 4(2) establishes the extent to which the requirements imposed by the Regulations apply to a healthcare contractor, such that those requirements only apply insofar as the healthcare contractor is able to control the relevant activities of the relevant employee. A healthcare contractor is therefore not responsible for matters beyond the healthcare contractor’s control.
5
Regulation 5 concerns the use and disposal of medical sharps – in particular, it provides that the use of medical sharps should be avoided so far as is possible, otherwise that ‘safer sharps’ are used where possible. It prohibits the practice of ‘re-capping’ except where required to control risk and where the risk to the employee is controlled by means of special equipment.
6
Regulation 6 requires an employer to provide information developed in cooperation with representatives (concerning matters listed in Schedule 1) and training (on matters listed in Schedule 2) to employees at risk of injury caused by medical sharps.
7
Regulation 7 requires an employer to record, investigate and take measures to prevent the recurrence of an injury to an employee caused by a medical sharp where notified. Employers must also take immediate steps to ensure that employees who may have been exposed to a biological agent as a result of such an injury receive medical attention and treatment, and must consider providing the employee with counselling.
8
Regulation 8 requires employees to notify any incident at work which results in that employee suffering an injury from a medical sharp to their employer or person responsible for health and safety.
9
Regulation 10 requires the Secretary of State to review the operation and effect of these Regulations and publish a report within five years after they come into force and within every five years after that. Following a review it will fall to the Secretary of State to consider whether the Regulations should remain as they are, or be revoked or be amended. A further instrument would be needed to revoke the Regulations or to amend them.
10
A full impact assessment of the effect that these Regulations will have on the costs of business is available from the Health and Safety Executive, Redgrave Court, Merton Road, Bootle, Merseyside L20 7HS. A copy of the transposition note in relation to implementation of the Directive set out in paragraph 1 can be obtained from the Health and Safety Executive, International Branch, also at the Redgrave Court address. Copies of both these documents have been placed in the Library of each House of Parliament and are annexed to the Explanatory Memorandum which is available alongside these Regulations at www.legislation.gov.uk.