6 RHI emission certificates
After regulation 5 insert—

“5A RHI emission certificates
1 An RHI emission certificate must be issued by a testing laboratory.
2 Where the information contained in an RHI emission certificate is based on testing carried out on or after the second relevant date, the testing laboratory must be accredited to BS EN ISO/IEC 17025:2005 at the time of testing.
ISBN 0 580 46330 3. Copies can be obtained from the British Standards Institute at www.bsigroup.com.
3 An RHI emission certificate must contain the information set out in Schedule A1.”

.