. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (6.4.2014) by The Smoke Control Areas (Authorised Fuels) (England) Regulations 2014 (S.I. 2014/491), regs. 1(c), 3