SCHEDULE 2 LIST OF EQUIPMENT WHICH MIGHT BE USED FOR INTERNAL REPRESSION AS REFERRED TO IN ARTICLES 4 AND 5
Articles 4 and 5

Definitions
1. In this Schedule—
“the UK Military List” means the list of military goods, software and technology in Schedule 2 to the 2008 Order;
“the Dual-Use Regulation” means Council Regulation (EC) No 428/2009 .
OJ L 134, 29.5.2009, p1 as last amended by Regulation (EU) No 388/2012 (OJ L 129, 16.5.2012, p12).

Equipment which might be used for internal repression
2. The list of equipment which might be used for internal repression includes the following—
(a) weapon sights not controlled by the UK Military List;
(b) bombs and grenades not controlled by the UK Military List;
(c) ground vehicles as follows, and specially designed components therefor—
(i) vehicles specially designed or modified to remove barricades, including construction equipment with ballistic protection;
(ii) vehicles specially designed for the transport of prisoners and/or detainees;
(iii) vehicles specially designed to deploy mobile barriers;
(d) protective equipment not controlled by ML13 of the UK Military List or Annex I of the Dual-Use Regulation as follows—
(i) body armour providing ballistic and/or stabbing protection;
(ii) helmets providing ballistic and/or fragmentation protection;
(iii) anti-riot helmets;
(e) night vision, thermal imaging equipment and image intensifier tubes, other than those controlled by the UK Military List or Annex I of the Dual-Use Regulation;
(f) razor barbed wire;
(g) military knives, combat knives and bayonets with blade lengths in excess of 10 cm;
(h) production equipment specially designed for the items specified in this list other than that controlled by the UK Military List or Annex I of the Dual-Use Regulation;
(i) technology which is specifically required for the development, production or use of the items specified in this list, other than that controlled by the UK Military List or Annex I of the Dual-Use Regulation.