2012 No. 815

Clean Air, England

The Smoke Control Areas (Exempted Fireplaces) (England) Order 2012 (revoked)
Made
13th March 2012
Laid before Parliament
16th March 2012
Coming into force
6th April 2012
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Citation, application and commencement
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Fireplaces exempted from the provisions of section 20 of the Clean Air Act 1993
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Revocation
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
SCHEDULE

Exempted Fireplaces
Article 2
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Order revoked (1.10.2012) by The Smoke Control Areas (Exempted Fireplaces) (England) (No. 2) Order 2012 (S.I. 2012/2282), arts. 1(c), 3