Statutory Instruments
2012 No. 809
Building And Buildings, England And Wales
The Energy Performance of Buildings (Certificates and Inspections)(England and Wales)(Amendment) Regulations 2012 (revoked)
Made 13th March 2012
Laid before Parliament 15th March 2012
Coming into force in accordance with regulation 1(2) and (3)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (9.1.2013) by The Energy Performance of Buildings (England and Wales) Regulations 2012 (S.I. 2012/3118), reg. 1(4), Sch. 3 (with reg. 44)

Citation, commencement, interpretation and extent
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Amendment of the Principal Regulations
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Amendment of the Building Regulations 2010
11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Revocation
12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Review under the 2011 Regulations
13. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
SCHEDULE

“SCHEDULE 2 PART 1
Regulation 35(2)(e)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
PART 2
Regulation 35(2)(f)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
SCHEDULE 3
Regulation 37

PART 1 ENERGY PERFORMANCE CERTIFICATES
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 2 DISPLAY ENERGY CERTIFICATES
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 3 AIR-CONDITIONING INSPECTION REPORTS
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .”

Regulation 10

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .