SCHEDULE 3

FEES FOR INSPECTIONS
Regulations 27(1), 30,31(2), 32(1)

General provisions relating to fees for inspections
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Fees: general
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Traditional herbal medicinal products
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Sites concerned with starting materials for traditional herbal medicinal products
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Wholesale dealer's licence: general
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Wholesale dealer's licence: traditional herbal medicinal products
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Wholesale dealer's licences: inspection of short duration
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Office-based inspections
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (1.4.2013) by The Medicines (Products for Human Use) (Fees) Regulations 2013 (S.I. 2013/532), reg. 59(1) (with reg. 59(2)-(4))