Statutory Instruments
2012 No. 199
Health And Safety
The Reporting of Injuries, Diseases and Dangerous Occurrences (Amendment) Regulations 2012 (revoked)
Regulations revoked (1.10.2013) by The Reporting of Injuries, Diseases and Dangerous Occurrences Regulations 2013 (S.I. 2013/1471), regs. 1(2), 18(1), Sch. 4 Table 1 (with regs. 18(3), 19)
Made 26th January 2012
Laid before Parliament 31st January 2012
Coming into force 6th April 2012

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Citation, commencement and interpretation
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Amendment of regulation 3 of the 1995 Regulations
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Amendment of regulation 7 of the 1995 Regulations
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Amendment of regulation 10 of the 1995 Regulations
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Amendment of Schedule 4 of the 1995 Regulations
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Amendment of the Safety Representatives and Safety Committees Regulations 1977
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Amendment of the Offshore Installations (Safety Representatives and Safety Committees) Regulations 1989
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Review
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .