EXPLANATORY NOTE
(This note is not part of the Order)
This Order designates Highbury Stadium, occupied by Fleetwood Wanderers Limited (trading as Fleetwood Town Football Club), and New York Stadium, occupied by Rotherham United Football Club (RUFC) Limited, as sports grounds requiring a safety certificate under the Safety of Sports Grounds Act 1975.
A full impact assessment has not been produced for this instrument.