The Ionising Radiation (Medical Exposure) (Amendment) Regulations 2011
Statutory Instruments
2011 No. 1567
Health And Safety
The Ionising Radiation (Medical Exposure) (Amendment) Regulations 2011
Made 21st June 2011
Laid before Parliament 28th June 2011
Coming into force 25th July 2011

The Secretary of State for Health is a Minister designated for the purposes of section 2(2) of the European Communities Act 1972 in relation to the making of safety measures in regard to radioactive substances and the emission of ionising radiation.
S.I. 1977/1718; there are no relevant amendments.
1972 c.68; s. 2(2) is amended by the Legislative and Regulatory Reform Act 2006 (c.51), section 27(1)(a) and the European Union (Amendment) Act 2008 (c. 7), section 3(3) and Schedule 1, Part 1.
The Secretary of State makes the following Regulations, in exercise of the powers conferred by section 2(2) of that Act:—