2 Fireplaces exempted from the provisions of section 20 of the Clean Air Act 1993
The fireplaces listed in the Schedule are exempt from the provisions of section 20 of the Clean Air Act 1993 (prohibition on emission of smoke in smoke control area), subject to the conditions listed in the Schedule.