Indexation of the rate limits for the tax year 2011–12
3. For the tax year 2011–12, the amount specified in section 12(3) (starting rate limit for savings) is replaced with “£2,560”.
Section 12 was substituted by paragraph 5 of Schedule 1 to FA 2008. The amount specified in section 12(3) was substituted by article 3 of S.I. 2008/3023. See also section 1(3) of FA 2010.