SCHEDULE 8 Form of notice of application
Regulation 4

PART 1 Application for a premises licence: Form of notice to be given to the responsible authorities

Two forms are specified for the purpose of this Part. Form A is to be used where there is only one applicant. Form B is to be used where there are two or more applicants.
Form A
Form B

PART 2 Application for a premises licence: form of notice to be published

PART 3 Application to vary a premises licence: Form of notice to be given to the responsible authorities

Two forms are specified for the purpose of this Part. Form A is to be used where there is only one applicant. Form B is to be used where there are two or more applicants.
Form A
Form B

PART 4 Application to vary a premises licence: Form of notice to be published

PART 5 Application to transfer a premises licence: Form of notice to be given to the responsible authorities

Two forms are specified for the purposes of this Part. Form A is to be used where there is only one applicant. Form B is to be used where there are two or more applicants.
Form A
Form B

PART 6 Application for the Reinstatement of a Premises Licence: Form of Notice to be Given to the Responsible Authorities

Two forms are specified for the purposes of this Part. Form A is to be used where there is only one applicant. Form B is to be used where there are two or more applicants.
Form A
Form B

PART 7 Application for a provisional statement: Form of notice to be given to the responsible authorities

Two forms are specified for the purposes of this Part. Form A is to be used where there is only one applicant. Form B is to be used where there are two or more applicants.
Form A
Form B

PART 8 Application for a provisional statement: Form of notice to be published