Amendments to Schedule 5 to the Government of Wales Act 2006
2. (1) Part 1 of Schedule 5 to the Government of Wales Act 2006 is amended in accordance with this article.
(2) In field 11 (housing) insert—

“Matter 11.1
The provision of automatic fire suppression systems in new residential premises.
In this matter “new residential premises” means—
(a) premises newly constructed for residential use;
(b) premises newly converted to residential use;
(c) premises converted to use as one or more new residences by subdivision of one or more existing residences; and
(d) premises converted to use as one or more new residences by amalgamation of one or more existing residences.”