2009 No. 411
National Health Service, England
The National Health Service (Charges for Drugs and Appliances) and (Travel Expenses and Remission of Charges) Amendment Regulations 2009
Made 27th February 2009
Laid before Parliament 5th March 2009
Coming into force
regulations 1 to 3 1st April 2009
regulation 4 6th April 2009
regulation 5 7th April 2009

The Secretary of State for Health makes the following Regulations in exercise of the powers conferred by sections 172, 174, 182, 183, 184 and 272(7) and (8) of the National Health Service Act 2006.
2006 c.41. By virtue of section 271 of the Act the powers conferred on the Secretary of State by those sections are exercisable only in relation to England.