PART 1 Introduction

1 Citation, commencement, application and interpretation
1 These Regulations may be cited as the National Health Service (Pharmaceutical Services) (Appliances) (Amendment) Regulations 2009 and come into force on 1st April 2010.
2 These Regulations apply in relation to England.
3 In these Regulations, the “principal Regulations” means the National Health Service (Pharmaceutical Services) Regulations 2005.
S.I.2005/641.