2009 No. 261
Environmental Protection
The Fluorinated Greenhouse Gases Regulations 2009 (revoked)
Regulations revoked (19.3.2015) by The Fluorinated Greenhouse Gases Regulations 2015 (S.I. 2015/310), regs. 1(1)(b), 34
Made 4th February 2009
Laid before Parliament 12th February 2009
Coming into force in accordance with regulation 1

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 1 Introductory provisions

1 Citation, commencement, extent and application
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2 Revocation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3 Interpretation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4 Competent authority
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 2 General provisions

5 Leakages
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6 Leakage checks of stationary equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7 Leakage checks of fire protection systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

8 Leakage detection systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

9 Records
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

10 Recovery of fluorinated greenhouse gases
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

11 Taking delivery of fluorinated greenhouse gases
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

12 Reporting requirements and the provision of information
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

13 Labelling
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

14 Instruction manuals
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

15 Prohibition on the use of sulphur hexafluoride
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

16 Placing on the market
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

17 Importation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

18 Proof of lawful import
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 3 Qualifications

CHAPTER 1 Stationary refrigeration, air conditioning and heat pump equipment

19 Certification and evaluation bodies
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

20 Qualification of individuals relating to certain stationary equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

21 Interim stationary equipment certificates for individuals – stationary equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

22 Certification bodies for companies – stationary equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

23 Certificates for companies – stationary equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

24 Interim company certificates – stationary equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

25 Certificates relating to certain stationary equipment issued in EEA States and Northern Ireland
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER 2 Fire protection systems and fire extinguishers

26 Certification and evaluation body
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

27 Qualification of individuals relating to fire protection systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

28 Interim fire protection system certificates for individuals
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

29 Certification bodies for companies – fire protection systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

30 Certificates for companies – fire protection systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

31 Interim company certificates – fire protection systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

32 Certificates relating to fire protection systems issued in EEA States and Northern Ireland
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER 3 High-voltage switchgear

33 Certification and evaluation bodies
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

34 Qualification of individuals relating to high-voltage switchgear
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

35 Certificates relating to high-voltage switchgear issued in EEA States and Northern Ireland
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER 4 Fluorinated greenhouse gas-based solvents

36 Fluorinated greenhouse gas-based solvents certification and evaluation bodies
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

37 Qualification of individuals relating to fluorinated greenhouse gas-based solvents
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

38 Certificates relating to fluorinated greenhouse gas-based solvents issued in EEA States and Northern Ireland
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER 5 Air conditioning systems in certain motor vehicles

39 Attestation bodies
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

40 Qualifications relating to air conditioning systems in motor vehicles
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

41 Attestations issued in EEA States and Northern Ireland
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER 6 Miscellaneous obligations

42 Obligation of employers to employ qualified employees
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

43 Training records
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

44 Obligations of certification bodies, attestation bodies and evaluation bodies to provide information
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 4 Enforcement, offences and penalties

45 Appointment of authorised persons
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

46 Powers of authorised persons
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

47 Information notices
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

48 Enforcement and prohibition notices
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

49 Appeals against enforcement or prohibition notices
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

50 Proceedings before a civil court
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

51 Miscellaneous offences
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

52 Bodies corporate, partnerships and unincorporated associations - offences
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

53 Penalties
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

54 Fixed penalties
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

55 Powers of the Secretary of State
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

56 Enforcement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 1 Interim Qualifications
Regulation 21
PART 1 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
PART 2 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
10 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
11 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
12 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
13 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
14 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
15 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
16 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
17 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
18 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
19 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
20 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
21 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
22 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
23 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
24 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
25 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
26 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 2 Certification and Evaluation Bodies (High-Voltage Switchgear)
Regulation 33

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 3 Form of Fixed Penalty Notice
Regulation 54(7)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .