2009 No. 2364
Transport And Works, England
Transport, England
The London Underground (Victoria Station Upgrade) Order 2009
Made 28th August 2009
Coming into force 18th September 2009

An application has been made to the Secretary of State, in accordance with the Transport and Works (Applications and Objections Procedure) (England and Wales) Rules 2006, for an Order under sections 1 and 5 of the Transport and Works Act 1992 (“the 1992 Act”).
S.I. 2006/1466.
1992 c. 42. As amended by S.I. 1995/1541, 1998/2226, S.I. 2000/3199 and S.I. 2006/958.
The Secretary of State caused an inquiry to be held for the purposes of the application pursuant to section 11 of the 1992 Act.
The Secretary of State, having considered the objections made and not withdrawn and the report of the person who held the inquiry, has determined to make an Order giving effect to the proposals comprised in the application with modifications which in the Secretary of State’s opinion do not make any substantial change in the proposals.
Notice of the Secretary of State’s determination was published in the London Gazette on 7th August 2009.
Accordingly, the Secretary of State, in exercise of the powers conferred by sections 1 and 5 of, and paragraphs 1 to 4, 7, 8, 10, 11 and 16 of Schedule 1 to, the 1992 Act, makes the following Order:—