SCHEDULE 1 General model provisions

32 Apparatus and rights of statutory undertakers in stopped-up streets
(1) Where a street is stopped up under article 9 (stopping up of streets), any statutory utility whose apparatus is under, in, on, along or across the street shall have the same powers and rights in respect of that apparatus, subject to the provisions of this article, as if this Order had not been made.
(2) Where a street is stopped up under article 9, any statutory utility whose apparatus is under, in, on, over, along or across the street may, and if reasonably requested to do so by the undertaker shall—
(a) remove the apparatus and place it or other apparatus provided in substitution for it in such other position as the utility may reasonably determine and have power to place it; or
(b) provide other apparatus in substitution for the existing apparatus and place it in such position as described in sub-paragraph (a).
(3) Subject to the following provisions of this article, the undertaker shall pay to any statutory utility an amount equal to the cost reasonably incurred by the utility in or in connection with—
(a) the execution of the relocation works required in consequence of the stopping up of the street; and
(b) the doing of any other work or thing rendered necessary by the execution of the relocation works.
(4) If in the course of the execution of relocation works under paragraph (2)—
(a) apparatus of a better type, of greater capacity or of greater dimensions is placed in substitution for existing apparatus; or
(b) apparatus (whether existing apparatus or apparatus substituted for existing apparatus) is placed at a depth greater than the depth at which the existing apparatus was,
and the placing of apparatus of that type or capacity or of those dimensions or the placing of apparatus at that depth, as the case may be, is not agreed by the undertaker, or, in default of agreement, is not determined by arbitration to be necessary, then, if it involves cost in the execution of the relocation works exceeding that which would have been involved if the apparatus placed had been of the existing type, capacity or dimensions, or at the existing depth, as the case may be, the amount which, apart from this paragraph, would be payable to the statutory utility by virtue of paragraph (3) shall be reduced by the amount of that excess.
(5) For the purposes of paragraph (4)—
(a) an extension of apparatus to a length greater than the length of existing apparatus shall not be treated as a placing of apparatus of greater dimensions than those of the existing apparatus; and
(b) where the provision of a joint in a cable is agreed, or is determined to be necessary, the consequential provision of a jointing chamber or of a manhole shall be treated as if it also had been agreed or had been so determined.
(6) An amount which, apart from this paragraph, would be payable to a statutory utility in respect of works by virtue of paragraph (3) (and having regard, where relevant, to paragraph (4)) shall, if the works include the placing of apparatus provided in substitution for apparatus placed more than 7 years and 6 months earlier so as to confer on the utility any financial benefit by deferment of the time for renewal of the apparatus in the ordinary course, be reduced by the amount which represents that benefit.
(7) Paragraphs (3) to (6) shall not apply where the authorised project constitutes major highway works, major bridge works or major transport works for the purposes of Part 3 of the 1991 Act, but instead—
(a) the allowable costs of the relocation works shall be determined in accordance with section 85 of that Act (sharing of cost of necessary measures) and any regulations for the time being having effect under that section; and
(b) the allowable costs shall be borne by the undertaker and the statutory utility in such proportions as may be prescribed by any such regulations.
(8) In this article—
“apparatus” has the same meaning as in Part 3 of the 1991 Act;
“relocation works” means work executed, or apparatus provided, under paragraph (2); and
“statutory utility” means a statutory undertaker for the purposes of the 1980 Act or a public communications provider as defined in section 151(1) of the Communications Act 2003.
2003 c.21. There are amendments to this Act which are not relevant to this Order.