2 Designation of a Gas Transporter
National Grid Gas plc (company registered number 2006000) is designated as a designated gas transporter for the purposes of sections 85 to 90 of the Counter-Terrorism Act 2008 for so long as it holds a licence under section 7 of the Gas Act 1986.
1986 c. 44. Section 7 was substituted by the Gas Act 1995 (c. 45), section 5, and was amended by the Utilities Act 2000, sections 3 and 76, and Schedule 6, Part 1, paragraphs 1 and 4, and Schedule 8, and the Energy Act 2004, sections 149 and 197(9), and Schedule 23, Part 1.