PART 2 BENEFITS FOR OFFICERS

CHAPTER 2.D MEMBERS’ RETIREMENT BENEFITS

Entitlement to pensions

2.D.9 Re-assessment of entitlement to an ill-health pension determined under regulation 2.D.8
1 This regulation applies if—
(a) in the opinion of the Secretary of State a member meets the condition in regulation 2.D.8(2)(a), and
(b) at the time the member is awarded a pension under that regulation the Secretary of State gives the member notice in writing that the member’s case may be considered once within a period of three years commencing with the date of that award to determine whether the member meets the condition in regulation 2.D.8(3)(a) at the date of such a consideration.
2 A member to whom such a notice under paragraph (1)(b) has been given may apply to the Secretary of State for a review of whether he subsequently meets the condition in regulation 2.D.8(3)(a) if—
(a) the member makes the application in writing within three years of the date of issue of the notice,
(b) the request is accompanied by further written medical evidence—
(i) relating to whether the condition in regulation 2.D.8(3)(a) is satisfied at the date of the Secretary of State’s review;
(ii) that relates to the same physical or mental impairment as a result of which the member met the condition in regulation 2.D.8(2)(a), and
(c) no previous application has been made under this paragraph.
3 If, after considering the further medical evidence provided by the member, the Secretary of State determines that the member meets the condition in 2.D.8(3)(a), then as from the date on which that determination is made the member—
(a) ceases to be entitled to a tier 1 ill-health pension; and
(b) becomes entitled to a tier 2 ill-health pension under regulation 2.D.8, which shall be calculated as if paragraph (8) of that regulation included the words “from the date of the Secretary of State’s determination under regulation 2.D.9” after “continued in service”.