2008 No. 647
BUILDING AND BUILDINGS, ENGLAND AND WALES
The Energy Performance of Buildings (Certificates and Inspections) (England and Wales) (Amendment) Regulations 2008 (revoked)
Regulations revoked (9.1.2013) by The Energy Performance of Buildings (England and Wales) Regulations 2012 (S.I. 2012/3118), reg. 1(4), Sch. 3 (with reg. 44)
Made 6th March 2008
Laid before Parliament 13th March 2008
Coming into force 6th April 2008

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1 Citation, extent and commencement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2 Amendments to the principal regulations
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .