PART 3 Capital Fees for Applications for Authorizations, Registrations, Licences, Certificates or Authorisations and for Associated Inspections

13 Fee for applications for copy certificates of good manufacturing practice
The fee payable by an applicant for a certified copy of a certificate of good manufacturing practice issued pursuant to Article 111(5) of the 2001 Directive is £63.