EXPLANATORY NOTE
(This note is not part of the Order)
This Order grants an exemption from the requirements of section 4(1)(a) of the Electricity Act 1989 (which prohibits the generation of electricity for supply without a licence) to Little Cheyne Court Wind Farm Limited in respect of the Little Cheyne Court Wind Farm which is located near Rye, Kent.
A regulatory impact assessment in respect of exemptions from the requirements of section 4(1)(a) of the Electricity Act 1989 was prepared in 2001 and can be obtained from the Energy Strategy, Security and Markets Directorate, Department of Energy and Climate Change, 1 Victoria Street, London, SW1H 0ET. Copies have been placed in the libraries of both Houses of Parliament.