4 Conditions on exemption
The exemption granted by article 3 to the company is subject to compliance with the following conditions—
(a) that the company does not hold a licence under section 6(1)(a) of the Act (a generation licence);
Section 6 was substituted by section 30 of the Utilities Act 2000.
(b) that Little Cheyne Court Wind Farm is connected to the total system in England and Wales;
(c) that, except in circumstances outside the reasonable control of the company, Little Cheyne Court Wind Farm does not export more than 100 megawatts of electrical power to the total system in England and Wales.