2008 No. 1209
National Health Service, England
The Primary Ophthalmic Services Transitional Provisions Regulations 2008
Made 28th April 2008
Laid before Parliament 6th May 2008
Coming into force 3rd June 2008

The Secretary of State makes the following Regulations in exercise of the powers conferred by sections 43 and 79(3) of the Health Act 2006.
2006 c.28.