SCHEDULE 5 Minimum number of sampling points

PART 3 Group B pollutants
5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (11.6.2010) by The Air Quality Standards Regulations 2010 (S.I. 2010/1001), regs. 1(1), 33