SCHEDULE Fees

5 The official recognition of a test facility or organisation
The fee for the official recognition of a test facility or organisation is in accordance with the following table.

Official recognition of a test facility or organisation
Activity	Fee(£)
Initial official recognition of the test facility	1,500
Renewal of an official recognition	1,500
Each re-inspection	1,125
Note	
(1) Annex III to Council Directive 91/414/EEC requires that the tests and analyses of the efficacy data be conducted only by officially recognised testing facilities or organisations which are found to satisfy the requirements of the Directive following evaluation of their application and inspection of their facilities.	